aaa|===||aaa <param>||Development test command.
access-lists|============||access-lists||List all access lists.
elist|====||elist <list> <no>||Edit the specified list or list all the available lists.
amp|===||amp <no>|Edit the properties of the specified amplifier.
arp|===||arp|List the arp table.
app|===||app <property>||Edit interpreter properites.
badl|====||badl <list entry>||Mark a list as being bad. Will be deleted AFTER the next processing cycle.
batch|=====||batch <list>||Execute a batch list.
bert|====||bert <no> (on/off)||Check the status or activate/deactivate the specified BERT device.
help|====||help <topic>||Get command list or detail on the specified topic.
motd|====||motd <message>||Set the message of the day for the interpreter. The message must be quote surrounded.
prompt|=====||prompt <new prompt>||Set a new prompt for the interpreter. The prompt will be avilable when the interpreter is re-started. The new prompt must be quote surrounded.
quit|====||quit||Exit the application.
date|====||date||Output the current date.
list|====||list <new list/(all)>||Create a new batch list, or list all existing lists.
time2|====||time2||Output the current time.
loglevel|====||loglevel||Log verbosity; from 0 (Off) to 4 (Maximum).
filet|====||filet||A fine cut of meat.

